2.0

1.5

1.0

0.5

0.0

-1.0 -0.5 0.0 0.5 1.0

30 meV

LDA Calculated Fermi Surface for (La_{2-x}Sr_x)CuO_4 (x=0.20)

k_x(π/a) k_y (π/a)